From 9005af1fd8600cb273436977d02d99e01bf118ac Mon Sep 17 00:00:00 2001
From: "scherkus@chromium.org"
 <scherkus@chromium.org@0039d316-1c4b-4281-b951-d872f2087c98>
Date: Thu, 9 Apr 2009 22:04:06 +0000
Subject: Checking in FFmpeg benchmarking application.

We use this to compare different compiler setting, different run-time flags and different branches and revisions of FFmpeg.

Review URL: http://codereview.chromium.org/63068

git-svn-id: svn://svn.chromium.org/chrome/trunk/src@13468 0039d316-1c4b-4281-b951-d872f2087c98
---
 third_party/ffmpeg/avcodec-52.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'third_party/ffmpeg/avcodec-52.def')

diff --git a/third_party/ffmpeg/avcodec-52.def b/third_party/ffmpeg/avcodec-52.def
index 13e99ff..7a377304 100644
--- a/third_party/ffmpeg/avcodec-52.def
+++ b/third_party/ffmpeg/avcodec-52.def
@@ -2,6 +2,7 @@ LIBRARY avcodec-52
 EXPORTS
   av_bitstream_filter_init
   avcodec_alloc_context
+  avcodec_alloc_frame
   avcodec_decode_audio2
   avcodec_decode_video
   avcodec_find_decoder
-- 
cgit v1.1

